From a9837329d697a9e18401309a1496cc3b5015bc6a Mon Sep 17 00:00:00 2001
From: eliott <eliott@cactuswax.net>
Date: Sat, 17 Nov 2007 00:01:58 -0800
Subject: Hand diff of simo's patch to remove flag safe functionality.

Simo's original commit text:
 The idea of safe flagging is unclear, poorly named, misunderstood,
 and not even used. At the time this patch was created, less than
 a third of the packages in unsupported were flagged safe, and less
 than a tenth of users knew how to interpret it.

 The safe flag has been replaced by a disclaimer on the main page.
---
 support/schema/aur-schema.sql | 2 --
 1 file changed, 2 deletions(-)

(limited to 'support/schema/aur-schema.sql')

diff --git a/support/schema/aur-schema.sql b/support/schema/aur-schema.sql
index 97828fce..c1697f9a 100644
--- a/support/schema/aur-schema.sql
+++ b/support/schema/aur-schema.sql
@@ -123,8 +123,6 @@ CREATE TABLE Packages (
 	SubmitterUID INTEGER UNSIGNED NOT NULL DEFAULT 0,     -- who submitted it?
 	MaintainerUID INTEGER UNSIGNED NOT NULL DEFAULT 0,    -- User
 	AURMaintainerUID INTEGER UNSIGNED NOT NULL DEFAULT 0, -- TU/Dev
-	Safe TINYINT UNSIGNED NOT NULL DEFAULT 0,             -- verified to be safe?
-	VerifiedBy INTEGER UNSIGNED NOT NULL DEFAULT 0,       -- who verified?
 	FULLTEXT (Name,Description),
 	PRIMARY KEY (ID),
 	UNIQUE (Name),
-- 
cgit v1.2.3-24-g4f1b

